2000 2100 2200 2300 350

400

450

500

550

CO2

RCP2.6 RCP4.5 1.5C 2.0C

2000 2100 2200 2300

1200

1300

1400

1500

1600

1700

1800

1900

CH4

RCP2.6 RCP4.5 1.5C 2.0C

2000 2100 2200 2300 310 320 330 340 350 360 370 380

N2O

RCP2.6 RCP4.5 1.5C 2.0C

2000 2100 2200 2300 600

800

1000

1200

1400 f11+f12

RCP2.6 RCP4.5 1.5C 2.0C